-- AlterTable
ALTER TABLE "Asistencia" ALTER COLUMN "created_at" SET DEFAULT (now() AT TIME ZONE 'utc'),
ALTER COLUMN "updated_at" SET DEFAULT (now() AT TIME ZONE 'utc'),
ALTER COLUMN "entrada" SET DEFAULT (now() AT TIME ZONE 'utc');

-- AlterTable
ALTER TABLE "Cliente" ALTER COLUMN "created_at" SET DEFAULT (now() AT TIME ZONE 'utc'),
ALTER COLUMN "updated_at" SET DEFAULT (now() AT TIME ZONE 'utc');

-- AlterTable
ALTER TABLE "Planilla" ALTER COLUMN "created_at" SET DEFAULT (now() AT TIME ZONE 'utc'),
ALTER COLUMN "updated_at" SET DEFAULT (now() AT TIME ZONE 'utc');

-- AlterTable
ALTER TABLE "TareaRealizada" ALTER COLUMN "created_at" SET DEFAULT (now() AT TIME ZONE 'utc');

-- AddForeignKey
ALTER TABLE "TareaRealizada" ADD CONSTRAINT "TareaRealizada_planilla_id_fkey" FOREIGN KEY ("planilla_id") REFERENCES "Planilla"("id") ON DELETE SET NULL ON UPDATE CASCADE;
